0 500 1000 1500 2000 2500 1

10

10^2

10^3

10^4

ACDPHA000

Nent = 14847 Mean = 246.6 RMS = 151.9

PHA for Tile 000_{ACDPHA000}

0 500 1000 1500 2000 2500 1

10

10^2

10^3

10^4

ACDPHA001

Nent = 14847 Mean = 247.8 RMS = 158

PHA for Tile 001_{ACDPHA001}

0 500 1000 1500 2000 2500 1

10

10^2

10^3

10^4

ACDPHA010

Nent = 14847 Mean = 217.4 RMS = 147.5

PHA for Tile 010_{ACDPHA010}

0 500 1000 1500 2000 2500 1

10

10^2

10^3

10^4

ACDPHA011

Nent = 14847 Mean = 241.1 RMS = 164.9

PHA for Tile 011_{ACDPHA011}

0 500 1000 1500 2000 2500 1

10

10^2

10^3

10^4

ACDPHA100

Nent = 14847 Mean = 272.9

RMS = 266.2

PHA for Tile 100 ACDPHA100

0 500 1000 1500 2000 2500 1

10

10^2

10^3

10^4

ACDPHA110

Nent = 14847 Mean = 268.8

RMS = 241

PHA for Tile 110 ACDPHA110

0 500 1000 1500 2000 2500 1

10

10^2

10^3

10^4

ACDPHA200

Nent = 14847 Mean = 267.1

RMS = 229.1

PHA for Tile 200 ACDPHA200

0 500 1000 1500 2000 2500 1

10

10^2

10^3

10^4

ACDPHA210

Nent = 14847 Mean = 308.3

RMS = 311.2

PHA for Tile 210 ACDPHA210

0 500 1000 1500 2000 2500 1

10

10^2

10^3

10^4

ACDPHA300 Nent = 14847 Mean = 280.8

RMS = 257.8

PHA for Tile 300_{ACDPHA300}

0 500 1000 1500 2000 2500 1

10

10^2

10^3

10^4

ACDPHA310 Nent = 14847 Mean = 253

RMS = 207

PHA for Tile 310_{ACDPHA310}

0 500 1000 1500 2000 2500 1

10

10^2

10^3

10^4

ACDPHA400 Nent = 14847 Mean = 256.2

RMS = 264.5

PHA for Tile 400_{ACDPHA400}

0 500 1000 1500 2000 2500 1

10

10^2

10^3

10^4

ACDPHA410 Nent = 14847 Mean = 264.3

RMS = 202.7

PHA for Tile 410_{ACDPHA410}

0 500 1000 1500 2000 2500 1

10

10^2

10^3

10^4

ACDPHA1000 Nent = 14847

Mean = 307.3 RMS = 220.2

PHA for Tile 1000_{ACDPHA1000}