0 5 10 15 20 25 0 100 200 300 400 500 600 700 800 900 1000

TKRTOT16A

Nent = 18112 Mean = 0 RMS = 0

TKR TOT Layer 16 Left_{TKRTOT16A}

0 5 10 15 20 25 0 100 200 300 400 500 600 700 800 900 1000

TKRTOT16B

Nent = 18112 Mean = 6.865 RMS = 6.892

TKR TOT Layer 16 Right_{TKRTOT16B}

0 5 10 15 20 25 0 100 200 300 400 500 600 700 800 900 1000

TKRTOT17A

Nent = 18112 Mean = 4.34 RMS = 5.284

TKR TOT Layer 17 Left_{TKRTOT17A}

0 5 10 15 20 25 0 100 200 300 400 500 600 700 800 900 1000

TKRTOT17B

Nent = 18112 Mean = 0 RMS = 0

TKR TOT Layer 17 Right_{TKRTOT17B}

0 5 10 15 20 25 0 100 200 300 400 500 600 700 800 900 1000

TKRTOT18A

Nent = 18112 Mean = 2.828

RMS = 4.423

TKR TOT Layer 18 Left TKRTOT18A

0 5 10 15 20 25 0 100 200 300 400 500 600 700 800 900 1000

TKRTOT18B

Nent = 18112 Mean = 0

RMS = 0

TKR TOT Layer 18 Right TKRTOT18B

0 5 10 15 20 25 0 100 200 300 400 500 600 700 800 900 1000

TKRTOT19A

Nent = 18112 Mean = 0

RMS = 0

TKR TOT Layer 19 Left TKRTOT19A

0 5 10 15 20 25 0 100 200 300 400 500 600 700 800 900 1000

TKRTOT19B

Nent = 18112 Mean = 2.96

RMS = 4.617

TKR TOT Layer 19 Right TKRTOT19B

0 5 10 15 20 25 0 100 200 300 400 500 600 700 800 900 1000

TKRTOT20A Nent = 18112 Mean = 0

RMS = 0

TKR TOT Layer 20 Left_{TKRTOT20A}

0 5 10 15 20 25 0 100 200 300 400 500 600 700 800 900 1000

TKRTOT20B Nent = 18112 Mean = 4.257

RMS = 5.861

TKR TOT Layer 20 Right_{TKRTOT20B}

0 5 10 15 20 25 0 100 200 300 400 500 600 700 800 900 1000

TKRTOT21A Nent = 18112 Mean = 2.885

RMS = 4.599

TKR TOT Layer 21 Left_{TKRTOT21A}

0 5 10 15 20 25 0 100 200 300 400 500 600 700 800 900 1000

TKRTOT21B Nent = 18112 Mean = 0

RMS = 0

TKR TOT Layer 21 Right_{TKRTOT21B}

0 5 10 15 20 25 0 100 200 300 400 500 600 700 800 900 1000

TKRTOT22A Nent = 18112

Mean = 2.404 RMS = 4.14

TKR TOT Layer 22 Left_{TKRTOT22A}

0 5 10 15 20 25 0 100 200 300 400 500 600 700 800 900 1000

TKRTOT22B Nent = 18112

Mean = 0 RMS = 0

TKR TOT Layer 22 Right_{TKRTOT22B}

0 5 10 15 20 25 0 100 200 300 400 500 600 700 800 900 1000

TKRTOT23A Nent = 18112

Mean = 0 RMS = 0

TKR TOT Layer 23 Left_{TKRTOT23A}

0 5 10 15 20 25 0 100 200 300 400 500 600 700 800 900 1000

TKRTOT23B Nent = 18112

Mean = 2.693 RMS = 4.51

TKR TOT Layer 23 Right_{TKRTOT23B}